
mstanko@1191: \set ON_ERROR_STOP on
mstanko@1191: 
mstanko@1191: --
mstanko@1191: -- PostgreSQL database dump
mstanko@1191: --
mstanko@1191: 
mstanko@1191: -- Dumped from database version 9.5.1
mstanko@1191: -- Dumped by pg_dump version 9.5.0
mstanko@1191: 
mstanko@1191: -- Started on 2016-03-31 11:38:13
mstanko@1191: 
mstanko@1191: SET statement_timeout = 0;
mstanko@1191: SET lock_timeout = 0;
mstanko@1191: SET client_encoding = 'UTF8';
mstanko@1191: SET standard_conforming_strings = on;
mstanko@1191: SET check_function_bodies = false;
mstanko@1191: SET client_min_messages = warning;
mstanko@1191: 
mstanko@1191: SET search_path = stammdaten, pg_catalog;
mstanko@1191: 
mstanko@1191: --
mstanko@1191: -- TOC entry 4707 (class 0 OID 535802)
mstanko@1191: -- Dependencies: 273
mstanko@1191: -- Data for Name: ortszuordnung_typ; Type: TABLE DATA; Schema: stammdaten; Owner: lada
mstanko@1191: --
mstanko@1191: 
mstanko@1191: COPY ortszuordnung_typ (id, ortstyp) FROM stdin;
mstanko@1191: U	Ursprungsort
mstanko@1191: A	Kerntechnische Anlage
mstanko@1191: Z	Ortszusatz
mstanko@1191: E	Entnahmeport
mstanko@1191: \.




