
mstanko@1191: \set ON_ERROR_STOP on
mstanko@1191: 
mstanko@1191: --
mstanko@1191: -- PostgreSQL database dump
mstanko@1191: --
mstanko@1191: 
mstanko@1191: -- Dumped from database version 9.5.1
mstanko@1191: -- Dumped by pg_dump version 9.5.0
mstanko@1191: 
mstanko@1191: -- Started on 2016-03-31 11:38:13
mstanko@1191: 
mstanko@1191: SET statement_timeout = 0;
mstanko@1191: SET lock_timeout = 0;
mstanko@1191: SET client_encoding = 'UTF8';
mstanko@1191: SET standard_conforming_strings = on;
mstanko@1191: SET check_function_bodies = false;
mstanko@1191: SET client_min_messages = warning;
mstanko@1191: 
mstanko@1191: SET search_path = stammdaten, pg_catalog;
mstanko@1191: 
mstanko@1191: 
mstanko@1191: --
mstanko@1191: -- TOC entry 4706 (class 0 OID 535799)
mstanko@1191: -- Dependencies: 272
mstanko@1191: -- Data for Name: ort_typ; Type: TABLE DATA; Schema: stammdaten; Owner: lada
mstanko@1191: --
mstanko@1191: 
mstanko@1191: COPY ort_typ (id, ort_typ) FROM stdin;
mstanko@1191: 1	dynamischer Messpunkt (nicht vordefiniert)
mstanko@1191: 2	vordefinierter Messpunkt
mstanko@1191: 3	REI-Messpunkit
mstanko@1191: 4	Fluss
mstanko@1191: 5	See
mstanko@1191: 6	Wasserwerk
mstanko@1191: 7	Kläranlage
mstanko@1191: 8	Deponie
mstanko@1191: 9	Müllverbrennungsanlage
mstanko@1191: 10	Messstation
mstanko@1191: 11	KTA
mstanko@1191: \.
mstanko@1191: 




