
mstanko@1191: \set ON_ERROR_STOP on
mstanko@1191: 
mstanko@1191: --
mstanko@1191: -- PostgreSQL database dump
mstanko@1191: --
mstanko@1191: 
mstanko@1191: -- Dumped from database version 9.5.1
mstanko@1191: -- Dumped by pg_dump version 9.5.0
mstanko@1191: 
mstanko@1191: -- Started on 2016-03-31 11:38:13
mstanko@1191: 
mstanko@1191: SET statement_timeout = 0;
mstanko@1191: SET lock_timeout = 0;
mstanko@1191: SET client_encoding = 'UTF8';
mstanko@1191: SET standard_conforming_strings = on;
mstanko@1191: SET check_function_bodies = false;
mstanko@1191: SET client_min_messages = warning;
mstanko@1191: 
mstanko@1191: SET search_path = stammdaten, pg_catalog;
mstanko@1191: 
mstanko@1191: --
mstanko@1191: -- TOC entry 4676 (class 0 OID 535694)
mstanko@1191: -- Dependencies: 239
mstanko@1191: -- Data for Name: datensatz_erzeuger; Type: TABLE DATA; Schema: stammdaten; Owner: lada
mstanko@1191: --
mstanko@1191: 
mstanko@1191: COPY datensatz_erzeuger (id, netzbetreiber_id, datensatz_erzeuger_id, mst_id, bezeichnung, letzte_aenderung) FROM stdin;
mstanko@1191: 1	06	KS	06010	Messstelle HLUG Kassel	2000-01-01 00:00:00
mstanko@1191: 2	06	DA	06060	Messstelle HLUG Darmstadt	2000-01-01 00:00:00
mstanko@1191: \.




